sonic.name jdays sonic.azm prop.corr u.off v.off u.gain v.gain degrees degrees ms^{-1} ms^{-1} atiK.50.5m 174:181 295.6 0.0 -0.01 -0.04 1.04 1.03 uw.100.5m 174:181 291.0 0.0 0.04 0.02 0.94 0.93 uw.175.5m 174:181 295.2 0.0 0.09 -0.01 0.95 0.95 atiK.250.5m 174:181 297.5 0.0 0.11 0.00 0.98 1.00

sonic.name jdays offset pitch roll cm s^{-1} degrees degrees atiK.50.5m 174:181 -2.0 -0.9 1.8 uw.100.5m 174:181 0.0 -1.9 -0.1 uw.175.5m 174:181 -2.0 -1.5 -0.8 atiK.250.5m 174:181 -3.0 -1.0 0.8

TABLE 1Summary of sonic anemometer data

TABLE 1Summary of sonic anemometer data

ops1 sonic.name jdays sonic.azm prop.corr u.off v.off u.gain v.gain degrees degrees ms^{-1} ms^{-1} atiK.50.10m 154:157 296.6 65.75 0.06 -0.03 1.03 1.03 uw.100.10m 154:157 292.4 65.65 0.11 -0.01 0.96 0.96 uw.175.10m 154:157 294.6 65.75 0.11 0.02 0.95 0.97 atiK.250.10m 154:157 299.0 65.75 0.09 0.08 0.98 1.04

sonic.name jdays offset pitch roll cm s^{-1} degrees degrees atiK.50.10m 154:157 0.0 -2.0 2.9 uw.100.10m 154:157 1.0 -1.8 -0.7 uw.175.10m 154:157 1.0 -1.7 -0.7 atiK.250.10m 154:157 -2.0 -0.7 0.5

ops2 sonic.name jdays sonic.azm prop.corr u.off v.off u.gain v.gain degrees degrees ms^{-1} ms^{-1} atiK.50.10m 157:163 296.0 0.0 0.06 -0.02 1.04 1.04 atiS.50.10m 167:170 296.4 0.0 -0.02 -0.08 0.96 1.03 atiS.50.10m 172:174 296.4 0.0 -0.01 -0.12 0.95 1.01 uw.100.10m 157:174 291.2 0.0 0.10 -0.04 0.96 0.93 uw.175.10m 157:174 293.9 0.0 0.11 0.01 0.95 0.95 atiK.250.10m 157:174 297.0 0.0 0.12 0.15 0.99 1.02

sonic.name jdays offset pitch roll cm s^{-1} degrees degrees atiK.50.10m 157:163 1.0 -2.3 2.5 atiS.50.10m 167:170 -2.0 0.2 1.1 atiS.50.10m 172:174 304 -2.3 2.7 uw.100.10m 157:174 1.0 -2.1 -0.6 uw.175.10m 157:174 0.0 -1.6 -0.6 atiK.250.10m 157:174 -3.0 -0.4 0.7

ops3