Julian day

T (C)

40 45 50 55 60 65

-15 -5 0 5 10 15

Roof-Top Sensors

Roof 10m.up

Julian day

RH (%)

40 45 50 55 60 65

0 20 40 60 80 100

ASTER 14:04 Jul 11 1994

DOWNWASH94