Temperature ( 2m.up ) (deg C)

-10 -5 0 5 10 15

19 24 est 12 19

1029.01030.01031.01032.0

Pressure (mb)

2.22.42.62.83.03.23.43.6

Specific Humidity (2m.up) (gm/kg)

T p q

Julian Day 49

Wind Speed (6m.up) (m/s)

0 1 2 3 4 5

0 90 180 270 360 90 180

Wind Direction

Speed Direction

Surface Energy Budget (W/m^2)

-100-50 0 50 100 150 200 net radiation sensible heat flux z/L (10m) gmt

-2 -1 0 1 2

0 2 4 6 8 10 12 14 16 18 20 22 24

ASTER 08:56 Jun 29 1994

DOWNWASH94

0 5 101520253035 u* (cm/s) z/L (10m) u* (cm/s) Bowen ratio