Psych tower at 250m rh.psyc.1.5m rh.psyc.3m rh.psyc.5m rh.psyc.7.5m rh.psyc.10m tdry.psyc.1.5m tdry.psyc.3m tdry.psyc.5m tdry.psyc.7.5m tdry.psyc.10m Pressure data p1.baro.1.5m p2.baro.1.5m p3.baro.1.5m Radiation data

pyg.in.rad pyg.in.case pyg.in.dome pyg.out.rad pyg.out.case pyg.out.dome psp.in.rad psp.out.rad net.rad T.srfc.rad Soil heat flux and temperature data G1.bush.8cm G2.gras.8cm G3.sand.8cm Tsoil.bush.1cm Tsoil.bush.3cm Tsoil.bush.5cm Tsoil.bush.7cm Tsoil.gras.1cm Tsoil.gras.3cm Tsoil.gras.5cm Tsoil.gras.7cm Tsoil.sand.1cm Tsoil.sand.3cm Tsoil.sand.5cm Tsoil.sand 7cm Fast SF6 cal and zero data cal.sf6.50.10m zero.sf6.50.10m cal.sf6.100.10m zero.sf6.100.10m cal.sf6.175.10m zero.sf6.175.10m cal.sf6.250.10m zero.sf6.250.10m cal.sf6.50.5m zero.sf6.50.5m cal.sf6.100.5m zero.sf6.100.5m cal.sf6.175.5m zero.sf6.175.5m cal.sf6.250.5m zero.sf6.250.5m conc:conc.175.5m Flags for 175m data wflag.uw.175.10m cflag.uw.175.10m wflag.uw.175.5m cflag.uw.175.5m Means for 250m tower

u.atiK.250.10m v.atiK.250.10m w.atiK.250.10m tc.atiK.250.10m t.250.10m h2o.250.10m conc.sf6.250.10m u.atiK.250.5m v.atiK.250.5m w.atiK.250.5m tc.atiK.250.5m t.250.5m h2o.250.5m conc.sf6.250.5m Covariances for 250m

tower u:u.250.10m u:v.250.10m u:v.250 10m u:w.250.10m u:tc.250.10m u:t.250.10m u:h2o.250.10m u:conc.250.10m v:v.250.10m v:w.250.10m v:tc.250.10m v:t.250.10m v:h2o.250.10m v:conc.250.10m w:w.250.10m w:tc.250.10m w:t.250.10m w:h2o.250.10m w:conc.250.10m tc:c.250.10m tc:t.250.10m tc:h2o.250.10m tc:conc.250.10m t:t.250.10m t:h2o 250.10m t:t.250.10m t:conc.250.10m h2o:h2o.250.10m h2o:conc.250.10m conc:conc.250 10m

u:u.250.5m u:v.250.5m u:w.250.5m u:tc.250.5m u:t.250.5m u:h2o.250.5m u:conc.250.5m v:v.250.5m v:tc.250.5m v:w.250.5m v:t.250.5m v:h2o.250 5m v:conc.250.5m w:w.250.5m w:tc.250.5m w:t.250.5m w:h2o.250.5m w:conc.250.5m

tc:tc.250.5m tc:t.250.5m tc:h2o.250.5m tc:conc.250.5m t:t.250.5m t:h2o.250.5m t:conc.250.5m h2o:h2o.250.5m h2o:conc.250.5m conc:conc.250.5m Flags for 250m data uflag.atiK.250.10m vflag.atK.250.10m wflag.atiK.250.10m tcflag.atiK 250.10m alev.atiK.250.10m blev.atiK.250.10m uflag.atiK.250.5m vflag.atiK.250.5m wflag.atiK.250.5m tcflag.atiK.250.5m alev.atiK.250.5m blev.atiK.250.5m Prop tower at 50m

u.prop.1.5m v.prop.1.5m u.prop.3m v.prop.3m u.prop.5m v.prop.5m u.prop.7.5m v.prop.7.5m u.prop.10m v.prop.10m u:u.100.10.m u:v.100.10m u:w.100.10.m u:c.100.10m u:t.100.10m u:conc.100.10m v v.100.10m v:w.100.0m v:c.100.10m v:t.100.10m v:conc.100.10m

w:w.100.10m w:c.100.10m w:t.100.10m w:conc.100.10m c:c.100.10m c:t.100.10m c:conc.100.10m t:t.100.10m t:conc.100.10m conc:conc.100.10m u:u.100.5m u:v.100.5m u:w.100.5m u:c.100.5m u:t.100.5m u:conc.100.5m v:v.100.5m v:w.100.5m v:c.100.5m v:t.100.5m v:conc.100.5m w:w.100.5m w:c.100.5m w:t.100.5m w:conc.100.5m c:c.100.5m c:t.100.5m c:conc.100.5m t:t.100.5m t:conc.100.5m conc:conc.100.5m Flags for 100m data uflag.uw.100.10m vflag.uw.100 10m wflag.uw.100.10m cflag.uw.100.10m uflag.uw.100.5m vflag.uw.100.5m wflag.uw.100.5m cflag.uw.100.5m Means for 175m tower u uw.175.10m v.uw.175.10m w.uw.175.10m c.uw.175.10m t.175.10m conc.sf6.175.10m Covariances for 175m tower u:u.175.10m u:v.175.10m u:w.175.10m u:c.175.10m u:t.175.10m u:conc.175.10m v:v.175.10m v:w.175.10m v:c.175.10m v:t.175.10m v:conc.175.10m w:w.175.10m w:c.175.10m w:t.175.10m w:conc.175.10m c:c.175.10m c:t.175.10m c:conc.175.10m t:t.175.10m t:conc.175.10m conc:conc.175.10m

u:u.175.5m u:v.175.5m u:w.175.5m u:c.175.5m u:t.175.5m u:conc.175.5m v:v.175.5m v:w.175.5m v:c.175.5m v:t.175.5m v:conc.175.5m w:w.175.5m w:c.175.5m w:t.175.5m w:conc.175.5m c:c.175.5m c:t.175.5m c:conc.175.5m t:t.175.5m t:conc.175.5m

Release line flow.sf6.00.1m Means for 50 m tower u.atiS.50.10m v.atiS.50.10m w.atiS.50.10m c.atiS.50.10m t.50.10m h2o.50.10m conc.sf6.50.10m u.atiS.50.5m v.atiS.50.5m w.atiS.50.5m c.atiS.50.5m t.50.5m h2o.50.5m conc.sf6.50.5m Covariances for 50m tower u:u.50.10m u:v.50.10m u:w.50.10m u:c.50.10m u:t.50.10m u:h2o.50.10m u:conc.50.10m v:v.50.10m v:w.50.10m v:c.50.10m v:t.50.10m v:h2o.50.10m v:conc.50.10m w:w.50.10m w:c.50.10m w:t.50.10m w:h2o.50.10m w:conc.50 10m

c:c.50.10m c:t.50 10m c:h2o.50 10m c:conc.50.10m t:t.50.10m t:h2o.50.10m t:conc.50.10m h2o:h2o.50.10m h2o:conc.50.10m conc:conc.50.10m

u:u.50.5m u:v.50.5m u:w.50.5m u:c.50.5m u:t.50.5m u:h2o.50.5m u:conc.50.5m v:v.50.5m v:w-50.5m v:c.50.5m v:t.50.5m v:h2o.50.5m v:conc.50.5m w:w.50.5m w:c.50.5m w:t.50.5m w:h2o.50.5m w:conc 50.5m c:t.50.5m c:c.50 5m c:h2o.50.5m c:conc.50.5m t:t.50.5m t:h2o.50.5m t:conc.50.5m h2o:h2o.50.5m h2o:conc.50 5.m conc:conc.50.5m Flags for 50m data uflag.atiS.50.10m vflag.atiS.50.10m wflag.atiS.50.10m cflag.atiS.50.10m uflag.atiS.50.5m vflag.atiS.50.5m wflag.atiS.50.5m cflag.atiS.50.5m Means for 100m tower u.uw.100.10m v.uw.100.10m w.uw.100.10m c.uw.100.10m t.100.10m conc.sf6.100.10m u.uw.100.5m v.uw.100.5m w.uw.100.5m c.uw.100.5m t 100 5m conc sf6 100 5m Covariences for 100m tower